\documentclass[a4paper,12pt]{article}
\newcommand\ds{\displaystyle}
\begin{document}

\parindent=0pt

QUESTION

If $f_X(x)$ is the probability density function of a continuous
random variable which can take any value of $x$, write down an
expression for the mean of the distribution.

\bigskip

ANSWER

mean$\ds=\mu=\int_{-\infty}^\infty xf_X(x)\,dx$.




\end{document}
