\documentclass[a4paper,12pt]{article}
\newcommand\ds{\displaystyle}
\begin{document}

\parindent=0pt

QUESTION

If the Fourier series is obtained for the function $f(t)$ defined
by\\ $f(t)=\left\{\begin{array}{ll}1+t,&0\leq t<2,\\ t+2,&2\leq
t<4,\end{array}\right.$ and $f(t+4)=f(t)$,\\ STATE the value of
the Fourier series at $t=2$, (you should not calculate the Fourier
series).

\bigskip


ANSWER

$f(t)$ has a discontinuity at $t=2$, so Fourier series at $t=2$
converges to

$\ds\frac{1}{2}\{f(2^-)+f(2^+)\}=\frac{1}{2}\{(1+2)+(2+2)\}=\frac{7}{2}$




\end{document}
